---
title: "Explorer API (Deprecated)"
description: "Legacy Explorer API reference for the Nym Mixnet Explorer. Deprecated in favour of the Node Status API."
schemaType: "TechArticle"
section: "APIs"
lastUpdated: "2026-03-15"
---

import { RedocStandalone } from 'redoc'
import { Callout } from 'nextra/components'

# Explorer API

<Callout type="warning">
The Explorer API is deprecated. Use the [Node Status API](/apis/ns-api) instead, which provides the same data and more.
</Callout>

The Explorer API is the legacy backend for the [Mixnet Explorer](https://nym.com/explorer).

## Mainnet endpoints

- **OpenAPI spec:** [explorer.nymtech.net/api/v1/openapi.json](https://explorer.nymtech.net/api/v1/openapi.json)
- **Swagger UI:** [explorer.nymtech.net/api/swagger/index.html](https://explorer.nymtech.net/api/swagger/index.html)

<br />

<RedocStandalone
  specUrl="https://explorer.nymtech.net/api/v1/openapi.json"
  options={{
    nativeScrollbars: true,
    theme: {
      sidebar: {
        backgroundColor: '#273239',
        textColor: '#FCFDFE'
      }
    }
  }}
/>

