import { Callout } from 'nextra/components';
import { VarInfo } from 'components/variable-info.tsx';
import { Steps } from 'nextra/components';import { Tabs } from 'nextra/components';
import { MyTab } from 'components/generic-tabs.tsx';
import TabsPortsNymNode from 'components/operators/snippets/tabs-ports-nym-node.mdx';
import PortsValidator from 'components/operators/snippets/ports-validator.mdx';
import NymNodeSpecs from 'components/operators/snippets/nym-node-specs.mdx';
import NTPSync from 'components/operators/snippets/ntp-time-sync.mdx'

# VPS Setup & Configuration

We aim for Nym Network to be reliable and quality base layer of privacy accross the globe, while growing as distributed as possible. It's essential to have a fine tuned machine as a foundation for the nodes to meet the requirements and be rewarded for their work.

<Callout type="info" emoji="ℹ️">
A sub-optimally configured VPS often results in a non-functional node. To follow these steps carefully will save you time and money later on.
</Callout>

<NymNodeSpecs />

## Full node configuration (validator)

To install a full node from scratch, refer to the [validator setup guide](../validator-setup.mdx) and follow the steps outlined there.

## VPS Configuration

Before node or validator setup, the VPS needs to be configured and tested, to verify your connectivity and make sure that your provider wasn't dishonest with the offered services.

<Callout type="info" emoji="ℹ️">
The commands listed in this chapter must be executed with a prefix `sudo` or from a root shell.
</Callout>

### Install Dependencies & Configure Firewall

SSH to your server as `root` or become one running `sudo -i` or `su`. If you prefer to administrate your VPS from a user environment, supply the commands with prefix `sudo`.

<Steps>

###### 1. Start with setting up the essential tools on your server.

- Get your system up to date
```sh
apt update -y && apt --fix-broken install
```
- Install dependencies
```sh
apt -y install ca-certificates jq curl wget ufw jq tmux pkg-config build-essential libssl-dev git ntp ntpdate
```
- Double check ufw is installed correctly
```sh
apt install ufw --fix-missing
```

###### 2. Synchronize time of your server

<NTPSync />

###### 3. Configure your firewall

For a `nym-node` or Nyx validator to recieve traffic, you need to open ports on the server.

<div>
  <Tabs items={[
    <code>nym-node</code>,
    <code>validator</code>,
    ]} defaultIndex="0">
    <MyTab><TabsPortsNymNode/></MyTab>
    <MyTab><PortsValidator/></MyTab>
  </Tabs>
</div>

</Steps>

For more information about your node's port configuration, check the [port reference table](#ports-reference-table) below.

## Setting `ulimit`

Linux machines limit how many open files a user is allowed to have. This is called a `ulimit`.

`ulimit` is 1024 by default on most systems. It needs to be set higher, because Nym Nodes make and receive a lot of connections with each others.

If you see errors such as:

```sh
Failed to accept incoming connection - Os { code: 24, kind: Other, message: "Too many open files" }
```

This means that the operating system is preventing network connections from being made.

### Set the `ulimit` via `systemd` service file

The ulimit setup is relevant for maintenance of Nym Node only.

<Steps>

###### 1. Query the `ulimit` with:

- For 'nym-node`:
```sh
grep -i "open files" /proc/$(ps -A -o pid,cmd|grep nym-node | grep -v grep |head -n 1 | awk '{print $1}')/limits
```
- For nyx validator
```sh
grep -i "open files" /proc/$(ps -A -o pid,cmd|grep nymd | grep -v grep |head -n 1 | awk '{print $1}')/limits
```

You'll get back the hard and soft limits, which looks something like this:

```sh
Max open files            65536                65536                files
```

If your output is **the same as above**, your node will *not* encounter any `ulimit` related issues.

###### 2. If either value is `1024`, you must raise the limit

- We recommend doing it via the `systemd` service file. Following the steps in [this guide](../nym-node/configuration.mdx#systemd).
- You will see there a line setting new `ulimit` threshold.
```sh
LimitNOFILE=65536
```

###### 3. Alternatively you can execute this command for system-wide setting of `ulimit`:

```sh
echo "DefaultLimitNOFILE=65535" >> /etc/systemd/system.conf
```
- Then reboot your server, and restart your node. When it comes back, use:
```sh
# for nym-node
cat /proc/$(pidof nym-node)/limits | grep "Max open files"

# for validator
cat /proc/$(pidof nym-validator)/limits | grep "Max open files"
```

- Make sure the limit has changed to `65535`.

</Steps>

### Set `ulimit` on non `systemd` based distributions

In case you choose tmux option for Nym Node automation, see your `ulimit` list by running:

```sh
ulimit -a
```

Watch for the output line `-n`:
```sh
-n: file descriptors          1024
```

You can change it either by running a command:
```sh
ulimit -u -n 4096
```

or editing `etc/security/conf` and add the following lines:

```sh
# Example hard limit for max opened files
username        hard nofile 4096

# Example soft limit for max opened files
username        soft nofile 4096
```

Then reboot your server and restart your node.

## Running `nym-node` as a non-root

Some operators prefer to run `nym-node` without root privileges. It's possible but still `nym-node` binary needs higher privileges for network-level operations demanding these permissions. If you are starting a new `nym-node` and want to run it as a non-root, follow [this guide](../nym-node/configuration#running-nym-node-as-a-non-root) before you proceed with the node setup sections.

## Ports reference tables

All node-specific port configuration can be found in `$HOME/.nym/<BINARY_TYPE>/<ID>/config/config.toml`. If you do edit any port configs, remember to restart your client node processes and change the configuration in the wallet settings.

### Nym node port reference

#### Mix Node functionality ports

| Default port | Use                       |
| ------------ | ------------------------- |
| `1789`       | Listen for Mixnet traffic |
| `1790`       | Listen for VerLoc traffic |
| `8080`       | Metrics http API endpoint |

#### Gateway functionality ports

| Default port    | Use                           |
|-----------------|-------------------------------|
| `1789`          | Listen for Mixnet traffic     |
| `9000`          | Listen for Client traffic     |
| `9001`          | WSS                           |
| `8080, 80, 443` | Reversed Proxy & Swagger page |
| `51822/udp`     | WireGuard                     |

#### Embedded Network Requester functionality ports

| Default port | Use                       |
|--------------|---------------------------|
| `9000`       | Listen for Client traffic |

### Validator port reference

All validator-specific port configuration can be found in `$HOME/.nymd/config/config.toml`. If you do edit any port configs, remember to restart your validator.

| Default port | Use                                  |
|--------------|--------------------------------------|
| `1317`         | REST API server endpoint             |
| `26656`        | Listen for incoming peer connections |
| `26660`        | Listen for Prometheus connections    |
